DROP TABLE IF EXISTS `soraldo_ele_widget`;
CREATE TABLE `soraldo_ele_widget` (
  `id` int(10) NOT NULL auto_increment,
  `nome_file` varchar(255) NOT NULL default '',
  `titolo` varchar(255) NOT NULL default '',
  `pos_or` int(1) NOT NULL default '1',
  `pos_ver` int(3) NOT NULL default '0',
  `attivo` int(1) NOT NULL default '0',
  PRIMARY KEY  (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=13 DEFAULT CHARSET=latin1;


INSERT INTO `soraldo_ele_widget` VALUES (1,'00_affluenze.php','00_affluenze.php',0,0,1),(2,'01_votanti.php','01_votanti.php',1,0,0),(3,'02_risultati.php','02_risultati.php',0,0,1),(4,'04_sezioni.php','04_sezioni.php',1,0,0),(5,'bar_affluenze.php','bar_affluenze.php',1,0,0),(6,'bloccocand.php','bloccocand.php',1,0,0),(7,'bloccogen.php','bloccogen.php',1,0,0),(8,'bloccolink.php','bloccolink.php',1,0,0),(9,'bloccoref.php','bloccoref.php',1,0,0),(10,'gom_affluenze.php','gom_affluenze.php',0,0,1),(11,'off_Votanti.php','off_Votanti.php',0,0,1),(12,'pie_affluenze.php','pie_affluenze.php',1,0,0);

