#
# ChangeLog for trunk/sql/aggiornamento-3.0_2021-02-12.sql
#
# Generated by Trac 1.5.3
# Jun 14, 2024, 12:27:53 PM

Tue, 30 Mar 2021 21:16:34 GMT roby [346]
	* trunk/admin/versione.php (modified)
	* trunk/client/modules/Elezioni/consiglieri.php (modified)
	* trunk/client/modules/Elezioni/grafici/gd_image.inc.php (modified)
	* trunk/client/modules/Elezioni/grafici/jpgraph.php (modified)
	* trunk/client/modules/Elezioni/grafici/jpgraph_bar.php (modified)
	* trunk/client/modules/Elezioni/grafici/jpgraph_date.php (modified)
	* trunk/client/modules/Elezioni/grafici/jpgraph_errhandler.inc.php (modified)
	* trunk/client/modules/Elezioni/grafici/jpgraph_pie.php (modified)
	* trunk/client/modules/Elezioni/grafici/votanti_graf.php (modified)
	* trunk/client/modules/Elezioni/grafici/voti_graf.php (modified)
	* trunk/client/modules/Elezioni/gruppo.php (modified)
	* trunk/client/versione.php (modified)
	* trunk/install/sql/eleonline.sql (modified)
	* trunk/sql/aggiornamento-3.0_2021-02-12.sql (added)

	ulteriori modifiche per adeguamento a php7
	Client: aggiornamento jpgraph


